\section{AX12 Struct Reference}
\label{structAX12}\index{AX12@{AX12}}
{\tt \#include $<$ax12.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
int8\_\-t($\ast$ {\bf hardware\_\-send} )(uint8\_\-t)
\item 
int16\_\-t($\ast$ {\bf hardware\_\-recv} )(void)
\item 
void($\ast$ {\bf hardware\_\-switch} )(uint8\_\-t)
\end{CompactItemize}


\subsection{Detailed Description}


Definition at line 92 of file ax12.h.

\subsection{Field Documentation}
\index{AX12@{AX12}!hardware\_\-send@{hardware\_\-send}}
\index{hardware\_\-send@{hardware\_\-send}!AX12@{AX12}}
\subsubsection[hardware\_\-send]{\setlength{\rightskip}{0pt plus 5cm}int8\_\-t($\ast$ {\bf AX12::hardware\_\-send})(uint8\_\-t)}\label{structAX12_d79b4242425791e732c2e94172365291}




Referenced by AX12\_\-init(), AX12\_\-send(), and AX12\_\-set\_\-hardware\_\-send().\index{AX12@{AX12}!hardware\_\-recv@{hardware\_\-recv}}
\index{hardware\_\-recv@{hardware\_\-recv}!AX12@{AX12}}
\subsubsection[hardware\_\-recv]{\setlength{\rightskip}{0pt plus 5cm}int16\_\-t($\ast$ {\bf AX12::hardware\_\-recv})(void)}\label{structAX12_0eb1fbbf7841532dacd86d68d9fb1edf}




Referenced by AX12\_\-init(), AX12\_\-recv(), and AX12\_\-set\_\-hardware\_\-recv().\index{AX12@{AX12}!hardware\_\-switch@{hardware\_\-switch}}
\index{hardware\_\-switch@{hardware\_\-switch}!AX12@{AX12}}
\subsubsection[hardware\_\-switch]{\setlength{\rightskip}{0pt plus 5cm}void($\ast$ {\bf AX12::hardware\_\-switch})(uint8\_\-t)}\label{structAX12_9a9a34c74c28fcc3e93e302e2440e757}




Referenced by AX12\_\-init(), AX12\_\-recv(), AX12\_\-send(), and AX12\_\-set\_\-hardware\_\-switch().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
aversive\_\-10-03-12/modules/devices/servo/ax12/{\bf ax12.h}\end{CompactItemize}
