\label{test__test000001}
 \begin{description}
\item[File \doxyref{vect2.h}{p.}{vect2_8h} ]polar -$>$ cartesian \& cartesian -$>$ polar seems to be ok.

\end{description}


\label{test__test000002}
 \begin{description}
\item[File \doxyref{uart.c}{p.}{uart_8c} ]None \end{description}


\label{test__test000003}
 \begin{description}
\item[File \doxyref{rc4.c}{p.}{rc4_8c} ]No tests for the moment.

\end{description}


\label{test__test000004}
 \begin{description}
\item[File \doxyref{rc4.c}{p.}{rc4_8c} ]No tests for the moment.

\end{description}


\label{test__test000005}
 \begin{description}
\item[File \doxyref{control\_\-system\_\-manager.h}{p.}{control__system__manager_8h} ]No test for the moment, only correct compilation.

\end{description}


\label{test__test000006}
 \begin{description}
\item[File \doxyref{ramp.h}{p.}{ramp_8h} ]filter a constante value to generate a ramp on the hardware. Everything is all right

\end{description}


\label{test__test000007}
 \begin{description}
\item[File \doxyref{encoders\_\-eirbot.c}{p.}{encoders__eirbot_8c} ]

\end{description}


\label{test__test000008}
 \begin{description}
\item[File \doxyref{encoders\_\-microb.c}{p.}{encoders__microb_8c} ]nothing done

\end{description}


\label{test__test000009}
 \begin{description}
\item[File \doxyref{lcd.c}{p.}{lcd_8c} ]works on mega32 with all on the same port and old normal wiring, how about more speific connections ?

\end{description}


\label{test__test000010}
 \begin{description}
\item[File \doxyref{lcd.c}{p.}{lcd_8c} ]works on mega32 with all on the same port and old normal wiring, how about more speific connections ?

\end{description}


\label{test__test000011}
 \begin{description}
\item[File \doxyref{hamming.c}{p.}{hamming_8c} ]Seems to work

\end{description}


\label{test__test000012}
 \begin{description}
\item[File \doxyref{hamming.c}{p.}{hamming_8c} ]Seems to work

\end{description}


\label{test__test000013}
 \begin{description}
\item[File \doxyref{adc.h}{p.}{adc_8h} ]nothing done

\end{description}


\label{test__test000014}
 \begin{description}
\item[File \doxyref{pwm.c}{p.}{pwm_8c} ]The modul fonctions and had been tested by Lamygalle.

\end{description}


\label{test__test000015}
 \begin{description}
\item[File \doxyref{pwm.h}{p.}{pwm_8h} ]No tests for the moment.

\end{description}


\label{test__test000016}
 \begin{description}
\item[File \doxyref{timers\_\-synch.c}{p.}{timers__synch_8c} ]This feature is not 100\% shure for the moment, but has been tested on M32 and M128

\end{description}


\label{test__test000017}
 \begin{description}
\item[File \doxyref{timers\_\-synch.c}{p.}{timers__synch_8c} ]This feature is not 100\% shure for the moment, but has been tested on M32 and M128

\end{description}
