\section{aversive\_\-10-03-12/modules/hardware/timer/timer\_\-init.c File Reference}
\label{timer__init_8c}\index{aversive\_\-10-03-12/modules/hardware/timer/timer\_\-init.c@{aversive\_\-10-03-12/modules/hardware/timer/timer\_\-init.c}}
{\tt \#include $<$aversive/timers.h$>$}\par
{\tt \#include $<$timer.h$>$}\par
{\tt \#include $<$timer\_\-intr.h$>$}\par
{\tt \#include $<$timer\_\-prescaler.h$>$}\par
{\tt \#include $<$timer\_\-config.h$>$}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf timer\_\-init} (void)
\begin{CompactList}\small\item\em Interface of the timer module. \item\end{CompactList}\end{CompactItemize}


\subsection{Function Documentation}
\index{timer\_\-init.c@{timer\_\-init.c}!timer\_\-init@{timer\_\-init}}
\index{timer\_\-init@{timer\_\-init}!timer_init.c@{timer\_\-init.c}}
\subsubsection[timer\_\-init]{\setlength{\rightskip}{0pt plus 5cm}void timer\_\-init (void)}\label{timer__init_8c_7b8ab79df77b57475a5494f5f81c3bd9}


Interface of the timer module. 

Init of all timers with static configutaion (see timer\_\-config.h) 

Definition at line 30 of file timer\_\-init.c.

References CS00\_\-REG, CS10\_\-REG, CS20\_\-REG, CS30\_\-REG, CS40\_\-REG, CS50\_\-REG, IRQ\_\-LOCK, IRQ\_\-UNLOCK, and timer\_\-intr\_\-init().

Referenced by main().